         180           8
   3.78225544671035        3.42713753860842        3.10684720994918     
   2.78599118331348        2.42458066289671        2.13808082149872     
   1.91098555133633        1.72647871064420     
  -13.9853185368961       -14.2502034981960       -14.6633728001717     
  -15.0072282433632       -15.3332948840909       -15.5498371164389     
  -15.9539972601642       -17.2596936295241     
 -2.997882489753343E-004  0.000000000000000E+000
  0.993248798191181       0.000000000000000E+000
  0.996303903481330       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
