         180           8
   7.34172111996040        7.18090870149129        7.00213668285302     
   6.82605826960633        6.66764955736321        6.52207425806291     
   6.36919658704940        6.20456897717054     
  -14.1264131257638       -14.0113586803252       -13.8521130765720     
  -13.5494820239356       -13.1455427062937       -12.8087779622633     
  -12.4694397360393       -12.0575282591239     
  7.385691535053003E-005  0.000000000000000E+000
  0.992778489158985       0.000000000000000E+000
  0.995853499181950       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
