         170           8
   2.81122054938862        2.58219165386826        2.22617959275978     
   1.92292662531787        1.65049618051594        1.33329755927787     
   1.10329302212603       0.946387438833063     
  -13.5015824726688       -13.8203783272384       -14.0879826056430     
  -14.3361540789758       -14.5947150108644       -14.7748469281959     
  -14.9703285864570       -15.3993640450411     
  1.554608140275003E-004  0.000000000000000E+000
  0.991950011898385       0.000000000000000E+000
  0.994982336076910       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
