         164           8
   3.19526823412429        2.80583852454863        2.50702596816031     
   2.26430899077381        1.98215532642252        1.68356326452646     
   1.46784165992867        1.44338511127351     
  -13.5724233469405       -13.7119588563407       -13.9455324523796     
  -14.1623655897471       -14.4153358039571       -14.6403620795576     
  -14.7867252252608       -15.1008689128616     
  1.274576996211177E-004  0.000000000000000E+000
  0.992267687741953       0.000000000000000E+000
  0.995176415187930       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
