         180           8
   2.55806575839327        2.32532801175094        2.21373511326199     
   2.04765011818836        1.94718161679601        1.84343194738784     
   1.75830297467242        1.63085091019918     
  -13.4809851293589       -13.2709201691342       -12.9453754392124     
  -12.5676263774418       -12.1587922803102       -11.6972396010256     
  -11.2042703815984       -10.6128633244674     
 -5.715683844948685E-005  0.000000000000000E+000
  0.992573569627321       0.000000000000000E+000
  0.995543524321585       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
