         180           8
   5.43263636694044        4.79465936224776        4.19760316277475     
   3.58937206088863        2.98394287790820        2.42286219536447     
   1.90368984654823        1.39094461931012     
  -9.57777306266991       -9.69345056116000       -9.87498131998048     
  -10.0691386595605       -10.3214046781614       -10.5543822414107     
  -10.7471082069709       -10.9495817285536     
 -4.716786287118578E-005  0.000000000000000E+000
  0.992426158882553       0.000000000000000E+000
  0.995273017557441       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
