         180           8
   5.98560690630485        5.24559767965376        4.55306414701755     
   3.88940324415827        3.28880109961870        2.50762978793181     
   1.74836861942376        1.23530797820150     
  -9.89001101547238       -10.1605814171387       -10.2809545673826     
  -10.4903067092011       -10.7085202895453       -10.7328673414512     
  -10.7616065118598       -11.0244558033065     
 -1.138236206192280E-004  0.000000000000000E+000
  0.992436912568310       0.000000000000000E+000
  0.995340006771734       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
