         180           8
   3.34423696415061        3.26639055886780        3.10770492644566     
   3.00458697997236        2.85630959082873        2.74667619975095     
   2.64558954959684        2.60148032904707     
  -13.9602012757132       -13.6932357269244       -13.3896219628499     
  -13.0423284940336       -12.6800055734293       -12.3161320655807     
  -11.9379863167267       -11.4220129403345     
 -5.890511247526214E-005  0.000000000000000E+000
  0.992403059577630       0.000000000000000E+000
  0.995393668608790       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
