         180           8
   4.42149625502746        4.06550376472521        3.69386520995847     
   3.35473801141441        3.05170322257567        2.76668672087795     
   2.55188279026217        2.53711981149501     
  -13.6845404239001       -13.9520245450389       -14.2201573878144     
  -14.5083450937229       -14.8148731640424       -15.0647646395940     
  -15.3025021336851       -15.6521877093075     
 -1.354972118401860E-004  0.000000000000000E+000
  0.992780178665650       0.000000000000000E+000
  0.995743109804788       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
