         180           8
   7.01981112348438        6.35846600210955        5.74087555893855     
   5.12764146172371        4.53177625984272        3.97028090912040     
   3.42207681802793        2.96291876528003     
  -9.73481386146807       -9.75392033316716       -9.81601147053222     
  -9.98732321064115       -10.2630960807020       -10.5229402605476     
  -10.7917239195457       -11.0913149414656     
 -5.251687815206581E-005  0.000000000000000E+000
  0.992509583074936       0.000000000000000E+000
  0.995443553843322       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
