         180           8
   9.55257344573703        8.86888325801946        8.22734788971543     
   7.57661849712901        6.93748661873761        6.32370212712294     
   5.72529558674856        5.12400220156504     
  -10.6377314076639       -10.6868740152603       -10.7529906432277     
  -10.8548978259595       -10.9765063305274       -11.1072336835354     
  -11.2657261105645       -11.4969191950933     
 -3.547904923638044E-005  0.000000000000000E+000
  0.992589408571512       0.000000000000000E+000
  0.995478577342006       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
