         180           8
   8.00750840663264        7.29877360286526        6.70741550755032     
   6.06635386602334        5.43414627773431        4.85142422473957     
   4.26048332395303        3.80896780497936     
  -10.0580461949686       -10.0894656063048       -10.1689577140309     
  -10.3739127237536       -10.5839802684570       -10.7805503844940     
  -11.0493026617611       -11.2387044983628     
 -9.311888470962134E-005  0.000000000000000E+000
  0.992548688014454       0.000000000000000E+000
  0.995498953323751       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
