         180           8
   3.87862621459583        3.41914650244771        3.04375459918060     
   2.66446749955355        2.32621052774469        2.00377878681423     
   1.75544782007815        1.61963129599886     
  -13.9913831910434       -14.4015902474584       -14.7182829743558     
  -15.0581525167697       -15.3941989954768       -15.7227135703553     
  -16.0135666972555       -16.3645907421603     
 -1.377553800463402E-004  0.000000000000000E+000
  0.992651505546569       0.000000000000000E+000
  0.995792779864436       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
