         180           8
   3.83135346945161        3.60775855045494        3.48393140277032     
   3.31387710006709        3.16568757686483        3.06929759019512     
   2.94940103788418        2.70847731116096     
  -13.4047466705898       -13.2000502480646       -12.8929788382576     
  -12.5720274833924       -12.1871625404585       -11.8166414204899     
  -11.4093106395693       -8.26649155117024     
 -9.722962610978506E-005  0.000000000000000E+000
  0.992704758962473       0.000000000000000E+000
  0.995767201084284       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
