         180           8
   3.14303608205563        3.06220181617325        2.88340018764607     
   2.72998113148725        2.60542907316754        2.44684273177474     
   2.33199116649496        2.16169976652325     
  -13.1950787993366       -13.0125581062905       -12.7195415811040     
  -12.4237705902977       -12.0851386457248       -11.6825837619234     
  -11.2520162860815       -10.9534532381219     
 -1.696410592702046E-004  0.000000000000000E+000
  0.992756100462147       0.000000000000000E+000
  0.995815922499708       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
