         180           8
   4.49294772512792        4.16071908361712        3.74555098049291     
   3.42851963527434        3.10372686436279        2.80142584500906     
   2.54851727507505        2.52778423338074     
  -13.1631109895842       -13.5601648204567       -13.9271341769611     
  -14.2380835004379       -14.5988346241431       -15.2961404124290     
  -15.8962611928561       -16.1981042832668     
 -1.804880038541546E-004  0.000000000000000E+000
  0.992916745419637       0.000000000000000E+000
  0.996011375572983       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
