         180           8
   8.06157822227319        7.30141063732543        6.57969909656472     
   5.92314530541397        5.26363124720893        4.64377351429962     
   4.04385370366400        3.56093524794623     
  -9.37021325376084       -9.46579413504961       -9.62314116966616     
  -9.80264538224361       -10.0154746182224       -10.2657040068153     
  -10.5164445587467       -10.8173745644941     
  2.214937615391984E-004  0.000000000000000E+000
  0.992116639632238       0.000000000000000E+000
  0.995008932929962       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
