         180           8
   3.15357212959803        3.04298740377045        2.84057602507108     
   2.71448673109086        2.53208580623462        2.33438869092384     
   2.22737514145865        2.16719182916125     
  -13.4538671096535       -13.2745873655078       -12.9751852542230     
  -12.6098927797008       -12.1717697830517       -11.7261090479850     
  -11.3216338305397       -10.9654342818309     
  1.700088480277962E-004  0.000000000000000E+000
  0.992286521208311       0.000000000000000E+000
  0.995175299458586       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
