         180           8
   3.96430175552198        3.76122460471492        3.56524801670921     
   3.38497383721884        3.21981822235861        3.06738683760843     
   2.92685104658202        2.72889426262052     
  -14.0199875331927       -13.8136435369011       -13.5315975483448     
  -13.1911263304360       -12.7652754978058       -12.3334883567670     
  -11.9119275331900       -11.5392267108214     
 -1.192633668092183E-004  0.000000000000000E+000
  0.992941398020654       0.000000000000000E+000
  0.995838380225489       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
