         180           8
   3.92443929769361        3.69982844921606        3.53920204044933     
   3.36900413374446        3.18842236473294        3.05583378011101     
   2.95668047303314        2.76757573122301     
  -13.8793580694294       -13.7005257378543       -13.3979025273323     
  -13.0587404724049       -12.6325947342078       -12.1828053715557     
  -11.7571646881176       -11.3118241589744     
 -1.769748446703508E-004  0.000000000000000E+000
  0.993134107981830       0.000000000000000E+000
  0.996026167171514       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
