         180           3
   12.3771632082715        10.2747840543242        8.19347959479317     
   9.25193098087550        9.67461321663853        10.0215759039904     
 -1.335981530813555E-003  0.000000000000000E+000
   1.00184561537119       0.000000000000000E+000
  0.998938014981915       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
