         180           8
   6.39778222366548        5.86502613748737        5.23840411398765     
   4.63290774301687        4.01716650137536        3.43596842461884     
   2.91796189827070        2.44578254810571     
  -10.1066113054632       -10.1216123174337       -10.2630543389290     
  -10.5383622393636       -10.8219486252851       -11.0518904011312     
  -11.2969478112790       -11.6031525655485     
 -2.390128021823529E-004  0.000000000000000E+000
  0.993007494320377       0.000000000000000E+000
  0.995877704378558       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
