         180           8
   3.28292363095349        3.12004748006631        2.96533329349089     
   2.81007379761959        2.65164411764207        2.50791823216093     
   2.39229861366848        2.25743594653596     
  -14.3018947629869       -14.0861372834958       -13.7570220482913     
  -13.4071159159015       -12.9836861767733       -12.5435197111375     
  -12.1190310631241       -11.6315405862237     
 -2.731229638851628E-004  0.000000000000000E+000
  0.993208266010804       0.000000000000000E+000
  0.996213591770509       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
