         180           8
   3.56983833418030        3.27757705568161        2.91570814428647     
   2.56149904976562        2.24388304987979        1.95405527499801     
   1.68833460022238        1.68519542597358     
  -14.1647684044263       -14.4622760699911       -14.7314297054999     
  -15.0238806651624       -15.2686403119429       -15.4610047370196     
  -15.6328228960753       -15.9456164069018     
  7.370617964833983E-005  0.000000000000000E+000
  0.992274766039283       0.000000000000000E+000
  0.995250276214081       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
