         180           8
   2.92943825025567        2.46621486961283        2.22702151016473     
   1.93678157290544        1.62208697831669        1.42607501980156     
   1.09051281275625        1.19777152151434     
  -14.5816609099033       -14.8724868304536       -15.1044919246183     
  -15.4327547263645       -15.7224903375005       -15.9509817433990     
  -16.2532982962725       -16.7041689042564     
  1.194103391514860E-004  0.000000000000000E+000
  0.992107792601800       0.000000000000000E+000
  0.995134921143141       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
