         180           8
   3.16585436529057        2.75517875771446        2.38837089769944     
   1.98431569070560        1.66125703661748        1.37438005447377     
   1.22408241809288        1.16987514584174     
  -13.9462823209366       -14.4072765579102       -14.7961538860069     
  -15.0979288838622       -15.3812578298068       -15.8958322868223     
  -16.4207253532509       -16.8815395521071     
 -1.390219859880036E-004  0.000000000000000E+000
  0.992683757566827       0.000000000000000E+000
  0.995598848061816       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
