         180           8
   5.12107769532801        4.98300362259577        4.78063974738051     
   4.60747844808773        4.45137326298588        4.25748650722083     
   4.13166007647687        4.02916355695795     
  -14.0079946234516       -13.7750516437056       -13.4735880846209     
  -13.1158273684423       -12.7425386363904       -12.3637928561906     
  -11.9989248314173       -11.4776787375793     
 -3.018852928935771E-005  0.000000000000000E+000
  0.992649778339055       0.000000000000000E+000
  0.995700027691361       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
