         114           8
   6.11993097567255        5.69564693099948        5.29168370448037     
   4.88321573124242        4.49162327532027        4.11622940666095     
   3.70710649108514        3.34137886070652     
  -10.1886865843400       -10.2101039577259       -10.2622742071358     
  -10.3207265708264       -10.4068732239925       -10.5248185316317     
  -10.6743088617465       -10.6780591363058     
 -6.725515398188537E-005  0.000000000000000E+000
  0.992275183763882       0.000000000000000E+000
  0.995066226476695       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
