         180           8
   6.14140376403126        5.40205799329176        4.76542258285532     
   4.15332316032434        3.52375892138004        2.97951888135227     
   2.50115352442098        1.93645618390685     
  -10.0100317982676       -10.0365165948302       -10.2025804438438     
  -10.4008677241435       -10.6219802320580       -10.8434113081646     
  -11.0507443859818       -11.3569232742112     
 -1.145996432263716E-004  0.000000000000000E+000
  0.992426256968755       0.000000000000000E+000
  0.995185754506272       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
