         180           8
   6.20897325706579        5.51575083088499        4.89770846198707     
   4.28158176182822        3.63508586093464        3.03208602135979     
   2.53072914797729        2.08649290639035     
  -9.70565582670243       -9.83282599018207       -9.99626572471832     
  -10.1878611578120       -10.3990580106037       -10.6346385431550     
  -10.9102947427093       -11.2518035281847     
 -1.928741459876888E-004  0.000000000000000E+000
  0.992675367116106       0.000000000000000E+000
  0.995399928504503       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
