         162           8
   4.20223388374175        3.57532301959509        3.03201148460865     
   2.33830413884691        1.61527548103287        1.01726520688818     
  0.470397076724599      -1.379305741398341E-002
  -14.3728635887697       -14.5241895718676       -14.5798760186377     
  -14.7883056745503       -15.0942195791260       -15.4178714953568     
  -15.7310331254832       -15.9437945210067     
  1.911038766371431E-004  0.000000000000000E+000
  0.992501008900195       0.000000000000000E+000
  0.995358723954639       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
