         175           8
   4.17671894265387        3.44030645779265        2.85804311159741     
   2.22555978556198        1.57968821300306        1.00764708632200     
  0.465199097652080      -4.825214785742934E-003
  -14.4148835097452       -14.3977579800008       -14.5046611503721     
  -14.6739926235240       -14.8746080667139       -15.1347314720858     
  -15.4071608684125       -15.7035267382411     
  1.471488513057357E-004  0.000000000000000E+000
  0.992768494771487       0.000000000000000E+000
  0.995625902715822       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
