         180           8
   4.08447815220799        3.40652706528220        2.80488278212875     
   2.14829818430785        1.54253776997216        1.00124867130774     
  0.435895775275847      -0.126109751596557     
  -14.4850552881972       -14.5561661065386       -14.6392019986853     
  -14.7789613747214       -15.0082615125772       -15.2774858868425     
  -15.4955321076949       -15.6496644916886     
  8.697946457601424E-005  0.000000000000000E+000
  0.993043555717152       0.000000000000000E+000
  0.995923572048530       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
