         170           8
   4.59205445160433        3.89579983812997        3.22258316641002     
   2.58001985445736        2.00752916823982        1.39331727048671     
  0.744802704377910       0.297413916117117     
  -10.8048346759562       -10.9448219703901       -11.1305309035410     
  -11.3166839908717       -11.5188176732218       -11.7889837375563     
  -12.2041291143729       -12.2073279406760     
  9.276512386378928E-004  0.000000000000000E+000
  0.991478195749848       0.000000000000000E+000
  0.994356473065519       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
