         174           3
   13.6040174909168        11.4016748483158        9.65714619058247     
   11.1913782270331        11.6415933772358        12.0403734516823     
 -1.487735024618203E-003  0.000000000000000E+000
   1.00187415374085       0.000000000000000E+000
  0.998529283354232       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
