         174           8
   4.87165159882813        4.06048842766113        3.37436386924522     
   2.69390841100640        2.07441308460068        1.46997906029710     
  0.928245052747950       0.449400408369807     
  -10.8053000206653       -10.8600051029172       -10.9803688769459     
  -11.1663748430802       -11.3898117417739       -11.6808014385131     
  -11.9498674391761       -12.1242109516513     
  8.319251565084726E-004  0.000000000000000E+000
  0.991690720855174       0.000000000000000E+000
  0.994473516369337       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
