         180           8
   7.15250059635739        6.62558360665619        6.01285238138396     
   5.40669457276540        4.74979869089032        4.15506209366543     
   3.53810685627224        3.05590503921740     
  -11.1017674175895       -11.1222681006684       -11.2589875823136     
  -11.5149286323694       -11.7703938239361       -12.0379188247727     
  -12.3575081690945       -12.7114159853323     
  8.056829758006056E-004  0.000000000000000E+000
  0.991921046780208       0.000000000000000E+000
  0.994623906060341       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
