         180           8
   13.9835714798679        13.4618498184491        13.0514985713850     
   12.5801931154460        12.0629571493413        11.5763680170928     
   10.7632272822574        10.3324261559216     
   9.87231504116203        9.68622072590850        9.65783636435988     
   9.63462276239932        9.72706315896580        9.69120299144049     
   10.0142240561246        10.2364358021045     
 -2.154480364563102E-003  0.000000000000000E+000
   1.00067204050208       0.000000000000000E+000
   1.00003144701272       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
