         180           8
   6.36271601149192        5.69431323784581        5.07378070161553     
   4.48099902032477        3.86600113539460        3.29187630963506     
   2.72147818524677        2.37150902050900     
  -7.63285600062291       -7.71967439268945       -7.87993122988727     
  -8.00473783864062       -8.14959214636292       -8.38373833462256     
  -8.51266385873435       -8.61566072341892     
  4.030971809417157E-004  0.000000000000000E+000
  0.988122699202641       0.000000000000000E+000
  0.991144513987114       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
