         174           8
   3.24804216303469        2.98498306635880        2.65217063001076     
   2.36663997925257        2.05718367230322        1.82299359963227     
   1.63058715650182        1.41758137449900     
  -11.5995437766061       -11.8778082254843       -12.1166107528379     
  -12.3859588005821       -12.7387986148266       -12.9961956531015     
  -13.2374332774262       -13.6028523904773     
  4.028697113466338E-004  0.000000000000000E+000
  0.988652963106064       0.000000000000000E+000
  0.991656421760908       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
