         180           8
   3.27740247474022        2.96142596311292        2.62338496597334     
   2.29747716740314        2.01593307896384        1.79263915748762     
   1.60169207901686        1.56371951005563     
  -11.8396752346822       -12.0517036817497       -12.3369723869713     
  -12.6304322168751       -12.9077752171116       -13.1420209283932     
  -13.4539799665940       -13.7631847885815     
  4.109095527961273E-004  0.000000000000000E+000
  0.988637355472468       0.000000000000000E+000
  0.991715125581893       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
