         171           8
   3.70755463271576        3.32883725861576        2.98814221992819     
   2.68835933557779        2.41088279482679        2.17401008633947     
   1.98620401017322        1.96690770105368     
  -13.3124512268528       -13.6002741795712       -13.8694706968117     
  -14.1352111379509       -14.3941241512789       -14.6199890810706     
  -14.7924128995475       -15.1547602340028     
  2.950576283208739E-005  0.000000000000000E+000
  0.989092984997646       0.000000000000000E+000
  0.992140309291102       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
