         173           8
   4.22056987143115        3.76647181029502        3.40238329047077     
   3.07972957867616        2.80703344195557        2.57293698593397     
   2.40337307219306        2.42448027877559     
  -13.1002002263877       -13.5858821074181       -14.2154737755599     
  -14.6872550257241       -14.9460440125817       -15.1846570434766     
  -15.4483245359686       -15.7772349630744     
 -6.892521285443157E-005  0.000000000000000E+000
  0.989523686382174       0.000000000000000E+000
  0.992472591512656       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
