         180           8
   5.04279302183295        4.93198783378873        4.76344587158166     
   4.59374968505919        4.41288092206561        4.23884611670119     
   4.15693070783479        4.12259918923017     
  -13.6870789832171       -13.5932475575947       -13.3153849523561     
  -12.9913524967392       -12.6024775605450       -12.2001055685524     
  -11.8219302172822       -11.3933379923505     
 -7.888993072135729E-006  0.000000000000000E+000
  0.988820841085189       0.000000000000000E+000
  0.992031729237489       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
