         180           8
   4.25346781087799        3.91768895791105        3.58052926102438     
   3.27240088215614        2.98218418720076        2.72686481471493     
   2.52298757197177        2.35488032963073     
  -13.3109780179370       -13.6185854757064       -13.8891204192568     
  -14.1988917814121       -14.4998155503186       -14.7428084632891     
  -14.9228819524376       -15.2537937471756     
  1.747655871077153E-005  0.000000000000000E+000
  0.989178763515675       0.000000000000000E+000
  0.992315317164971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
