         180           8
   4.55269553274057        4.17576974090282        3.78749533234435     
   3.44461304082701        3.06742483235192        2.74843745220732     
   2.57689201347241        2.53114680378951     
  -12.9465895224251       -13.5724316557286       -13.9682935514635     
  -14.2890516977021       -14.6252842310049       -14.9541131193313     
  -15.2529634843369       -15.7733016756384     
  1.827612734738942E-005  0.000000000000000E+000
  0.988857560972782       0.000000000000000E+000
  0.992117426856596       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
