         180           8
   2.46693604742912        2.18558054172553        1.82838560416886     
   1.51863796365420        1.15899371887960       0.888048981872141     
  0.722499691738722       0.735514732749897     
  -14.1492201923675       -14.6670418853462       -14.9572072100805     
  -15.3526441680221       -15.7431624578503       -16.0618410076911     
  -16.4630212063231       -16.8047878195693     
 -2.072542598534058E-004  0.000000000000000E+000
  0.989076895877073       0.000000000000000E+000
  0.992214257588856       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
