         180
   9.28409703827967        6.84170877855940        3.95074703563526     
   2.73153341814941        1.66167780432054      -0.656508784394497     
  -3.05860418213610       -5.49470509281070       -8.92352611684453     
  -12.2243142403487     
   6.35271372157498        2.52639231410448       0.813613709163668     
 -0.286498070051411       -2.70037787892046       -5.47149330660401     
  -6.79415185787446       -7.84481500572570       -8.58031914739714     
  -10.3360760390946     
  0.000000000000000E+000 -1.162964604956750E-002  0.000000000000000E+000
 -1.135214294087397E-002 -1.161620988824850E-002 -1.147744227355036E-002
 -1.138861467958207E-002 -1.172323096005321E-002 -1.155812425963434E-002
 -1.163439450328431E-002  0.000000000000000E+000 -1.153482803383393E-002
  0.000000000000000E+000 -1.147675367539800E-002  0.000000000000000E+000
 -1.162354932752469E-002 -1.161715706425179E-002  0.000000000000000E+000
 -1.131025907346579E-002 -1.152659871998084E-002 -1.148515395955435E-002
  0.000000000000000E+000  0.000000000000000E+000 -1.146283965250044E-002
  0.000000000000000E+000 -1.154546888898018E-002  0.000000000000000E+000
 -1.151062800218743E-002 -1.139966483336980E-002 -1.162411002162736E-002
 -1.142540944882422E-002  0.000000000000000E+000 -1.155644486617117E-002
 -1.161868397392617E-002 -1.148355889851394E-002 -1.145000079438742E-002
  0.000000000000000E+000 -1.136411290867652E-002 -1.163532598336368E-002
 -1.128266172658088E-002 -1.146035242538079E-002 -1.159118877206765E-002
 -1.159368176815990E-002 -1.136876284190812E-002 -1.135070487769827E-002
 -1.137171632843669E-002 -1.152503326348339E-002 -1.132620338576718E-002
 -1.145306176459693E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.145365106967066E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.140627724758445E-002 -1.146587835252388E-002 -1.152238125796668E-002
 -1.157662181107248E-002 -1.136420530997197E-002 -1.154312379164654E-002
 -1.151818340517136E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.145971833051024E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.125194228599683E-002 -1.142452887859048E-002 -1.141012150668243E-002
 -1.126759903373760E-002 -1.131060906373417E-002  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000 -1.145602264672055E-002
 -1.152603932040302E-002 -1.134944943718532E-002 -1.138255788043660E-002
 -1.142832340809632E-002 -1.158301588622002E-002 -1.125244881469833E-002
 -1.138117314569611E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.146314252367065E-002 -1.143173230635025E-002 -1.135772997247321E-002
 -1.142296507423458E-002  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000 -1.122738233349438E-002 -1.136548787044251E-002
  0.000000000000000E+000  0.000000000000000E+000 -1.120132206405052E-002
 -1.147893081207488E-002  0.000000000000000E+000 -1.136910910727220E-002
 -1.126064549362567E-002 -1.152781355474803E-002  0.000000000000000E+000
  0.000000000000000E+000 -1.129309901935614E-002 -1.132444979890130E-002
  0.000000000000000E+000  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000 -1.145931653332860E-002  0.000000000000000E+000
 -1.140823212048516E-002 -1.142176374319193E-002 -1.136256044678621E-002
 -1.139481560969665E-002 -1.154299991101104E-002 -1.126400815207482E-002
  0.000000000000000E+000 -1.130067162490576E-002  0.000000000000000E+000
 -1.138510112390602E-002  0.000000000000000E+000 -1.121646074219347E-002
 -1.131966000298927E-002 -1.157318973292814E-002 -1.138318071489736E-002
 -1.130124966984238E-002  0.000000000000000E+000  0.000000000000000E+000
 -1.147236682880850E-002 -1.141876208102932E-002  0.000000000000000E+000
 -1.127960618982539E-002 -1.141523223897013E-002 -1.121356992281918E-002
 -1.148011122493965E-002 -1.153686689607624E-002 -1.152061137237797E-002
 -1.125633996116478E-002 -1.149696579625433E-002 -1.125413406056380E-002
 -1.143366781808113E-002 -1.154737704639544E-002 -1.134774464786263E-002
 -1.153517138412466E-002 -1.129902200179015E-002 -1.147798831867049E-002
 -1.140463792495923E-002 -1.140317080159966E-002 -1.139811755728748E-002
 -1.157230513509578E-002 -1.141965501308607E-002 -1.136317792588350E-002
 -1.144382601367009E-002 -1.129413151401227E-002 -1.138928083853569E-002
 -1.159493995534106E-002 -1.137587708828893E-002  0.000000000000000E+000
 -1.129634455409464E-002 -1.133426690948128E-002 -1.133892195619898E-002
 -1.121501852728109E-002 -1.144302450524831E-002 -1.147601800781849E-002
 -1.139021425306677E-002 -1.135358864271439E-002 -1.148906000831630E-002
 -1.154161843537551E-002 -1.140596357737009E-002 -1.140978582596050E-002
 -1.137441105379270E-002 -1.141785446008951E-002 -1.140314041563139E-002
 -1.124241311732646E-002 -1.142640543629368E-002 -1.121720811678701E-002
 -1.141241936271641E-002 -1.132713552660661E-002 -1.146448257619274E-002
  0.000000000000000E+000
   1.02781532920975       0.000000000000000E+000
   1.03068900606651       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
