         180           8
   1.87828002792464        1.76257803110082        1.60369143437863     
   1.42447998936764        1.35296409955460        1.31327438597048     
   1.27797315987856        1.12105854816725     
  -13.3969761786638       -13.2391107778094       -12.9914424184079     
  -12.6407737309034       -12.1809094024418       -11.7299285960049     
  -11.3363624550596       -10.9052484936083     
 -4.862949063905394E-004  0.000000000000000E+000
  0.989460443469083       0.000000000000000E+000
  0.992434237558485       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
