         180           8
   4.76491853989114        4.10650189711726        3.49830401134035     
   2.89898380452373        2.33548624430796        1.83698162566102     
   1.39232865618893       0.880378593880961     
  -9.26289583740571       -9.28800338756945       -9.38350882874665     
  -9.56907452879602       -9.75828708061056       -9.99545550935594     
  -10.2474611116959       -10.4706790739668     
 -4.869996960977359E-004  0.000000000000000E+000
  0.989520171112662       0.000000000000000E+000
  0.992233749319425       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
